Ag亚洲集团

新闻中心 新闻中心
wx

ELIX Polymers listed Top 10 material manufacturing companies in Europe in 2022

2022-08-18

ELIX Polymers, a subsidiary of Sinochem International, was listed as one of the Top 10 material manufacturing companies in Europe/U.K. 2022 by MedTech Outlook, a leading trade media in the medical technology industry.

ELIX’s prominence as a material producer lies in its advanced technology and well-integrated supply chain. It works to ensure that all its material components, including additives and masterbatch, meet biocompatibility requirements and relevant environmental standards.

Moreover, ELIX has developed diversified product portfolios, such as those with specific ABS properties for smart medical devices, and customized ABS products for 3D printing.

返回顶部
【网站地图】【sitemap】